CHAPTER VII

ORGANISATION OF ACCESS TO THE SYSTEM

Access to upstream pipeline networks
Article 34
1
Member States shall take the necessary measures to ensure that natural gas undertakings and eligible customers, wherever they are located, are able to obtain access to upstream pipeline networks, including facilities supplying technical services incidental to such access, in accordance with this Article, except for the parts of such networks and facilities which are used for local production operations at the site of a field where the gas is produced. The measures shall be notified to the Commission in accordance with the provisions of Article 54.
2
The access referred to in paragraph 1 shall be provided in a manner determined by the Member State in accordance with the relevant legal instruments. Member States shall apply the objectives of fair and open access, achieving a competitive market in natural gas and avoiding any abuse of a dominant position, taking into account security and regularity of supplies, capacity which is or can reasonably be made available, and environmental protection. The following matters may be taken into account:
a
the need to refuse access where there is an incompatibility of technical specifications which cannot reasonably be overcome;
b
the need to avoid difficulties which cannot reasonably be overcome and could prejudice the efficient, current and planned future production of hydrocarbons, including that from fields of marginal economic viability;
c
the need to respect the duly substantiated reasonable needs of the owner or operator of the upstream pipeline network for the transport and processing of gas and the interests of all other users of the upstream pipeline network or relevant processing or handling facilities who may be affected; and
d
the need to apply their laws and administrative procedures, in conformity with Community law, for the grant of authorisation for production or upstream development.
3
Member States shall ensure that they have in place dispute-settlement arrangements, including an authority independent of the parties with access to all relevant information, to enable disputes relating to access to upstream pipeline networks to be settled expeditiously, taking into account the criteria in paragraph 2 and the number of parties which may be involved in negotiating access to such networks.
4
In the event of cross-border disputes, the dispute-settlement arrangements for the Member State having jurisdiction over the upstream pipeline network which refuses access shall be applied. Where, in cross-border disputes, more than one Member State covers the network concerned, the Member States concerned shall consult each other with a view to ensuring that the provisions of this Directive are applied consistently. Where the upstream pipeline network originates from a third country and connects to at least one Member State, the Member States concerned shall consult each other and the Member State where the first entry point to the Member States' network is located shall consult the third country concerned where the upstream pipeline network originates, with a view to ensuring, as regards the network concerned, that this Directive is applied consistently in the territory of the Member States.
Substituted by Directive (EU) 2019/692 of the European Parliament and of the Council of 17 April 2019 amending Directive 2009/73/EC concerning common rules for the internal market in natural gas (Text with EEA relevance).