CHAPTER V

DISTRIBUTION AND SUPPLY

Combined operator
Article 29
Article 26(1) shall not prevent the operation of a combined transmission, LNG, storage and distribution system operator provided that operator complies with Articles 9(1), or 14 and 15, or Chapter IV or falls under Article 49(6).