CHAPTER VIII

ORGANISATION OF ACCESS TO THE SYSTEM

Third-party access
Article 32
1
Member States shall ensure the implementation of a system of third party access to the transmission and distribution systems based on published tariffs, applicable to all eligible customers and applied objectively and without discrimination between system users. Member States shall ensure that those tariffs, or the methodologies underlying their calculation, are approved prior to their entry into force in accordance with Article 37 and that those tariffs, and the methodologies — where only methodologies are approved — are published prior to their entry into force.
2
The transmission or distribution system operator may refuse access where it lacks the necessary capacity. Duly substantiated reasons must be given for such refusal, in particular having regard to Article 3, and based on objective and technically and economically justified criteria. The regulatory authorities where Member States have so provided or Member States shall ensure that those criteria are consistently applied and that the system user who has been refused access can make use of a dispute settlement procedure. The regulatory authorities shall also ensure, where appropriate and when refusal of access takes place, that the transmission or distribution system operator provides relevant information on measures that would be necessary to reinforce the network. The party requesting such information may be charged a reasonable fee reflecting the cost of providing such information.