CHAPTER VI

DISTRIBUTION SYSTEM OPERATION

Combined operator
Article 29
Article 26(1) shall not prevent the operation of a combined transmission and distribution system operator provided that operator complies with Articles 9(1), or 13 and 14, or Chapter V or falls under Article 44(2).