CHAPTER VI

DISTRIBUTION SYSTEM OPERATION

Confidentiality obligation of distribution system operators
Article 27
Without prejudice to Article 30 or any other legal duty to disclose information, the distribution system operator must preserve the confidentiality of commercially sensitive information obtained in the course of carrying out its business, and shall prevent information about its own activities which may be commercially advantageous being disclosed in a discriminatory manner.