CHAPTER IX

OBLIGATIONS CONCERNING INFORMATION TO BE PROVIDED TO INVESTORS
SECTION 3

Key investor information
Article 79
1
Key investor information shall constitute pre-contractual information. It shall be fair, clear and not misleading. It shall be consistent with the relevant parts of the prospectus.
2
Member States shall ensure that a person does not incur civil liability solely on the basis of the key investor information, including any translation thereof, unless it is misleading, inaccurate or inconsistent with the relevant parts of the prospectus. Key investor information shall contain a clear warning in this respect.