CHAPTER IV

OBLIGATIONS REGARDING THE DEPOSITARY
Article 25
1
No company shall act as both management company and depositary. No company shall act as both investment company and depositary.
2
In carrying out their respective functions, the management company and the depositary shall act honestly, fairly, professionally, independently and solely in the interest of the UCITS and the investors of the UCITS. In carrying out their respective functions, the investment company and the depositary shall act honestly, fairly, professionally, independently and solely in the interest of the investors of the UCITS.
A depositary shall not carry out activities with regard to the UCITS or the management company on behalf of the UCITS that may create conflicts of interest between the UCITS, the investors in the UCITS, the management company and itself, unless the depositary has functionally and hierarchically separated the performance of its depositary tasks from its other potentially conflicting tasks, and the potential conflicts of interest are properly identified, managed, monitored and disclosed to the investors of the UCITS.
Substituted by Directive 2014/91/EU of the European Parliament and of the Council of 23 July 2014 amending Directive 2009/65/EC on the coordination of laws, regulations and administrative provisions relating to undertakings for collective investment in transferable securities (UCITS) as regards depositary functions, remuneration policies and sanctions (Text with EEA relevance).