Article 8
1
For first and subsequent class 2 contained uses to be carried out in premises notified in accordance with Article 6, a notification containing the information listed in Annex V, Part B shall be submitted.
2
If the premises have been the subject of a previous notification to carry out class 2 or a higher class of contained uses and any associated consent requirements have been satisfied, the class 2 contained use may proceed immediately following the new notification.
However, the applicant may himself request from the competent authority a decision on the grant of a formal authorisation. The decision must be made within a maximum of 45 days from the notification.
3
If the premises have not been the subject of a previous notification to carry out class 2 or a higher class of contained uses, the class 2 contained use may, in the absence of any indication to the contrary from the competent authority, proceed 45 days after submission of the notification referred to in paragraph 1, or earlier with the agreement of the competent authority.