CHAPTER III

WASTE MANAGEMENT

Principles of self-sufficiency and proximity
Article 16
1
Member States shall take appropriate measures, in cooperation with other Member States where this is necessary or advisable, to establish an integrated and adequate network of waste disposal installations and of installations for the recovery of mixed municipal waste collected from private households, including where such collection also covers such waste from other producers, taking into account best available techniques.
By way of derogation from Regulation (EC) No 1013/2006, Member States may, in order to protect their network, limit incoming shipments of waste destined to incinerators that are classified as recovery, where it has been established that such shipments would result in national waste having to be disposed of or waste having to be treated in a way that is not consistent with their waste management plans. Member States shall notify the Commission of any such decision. Member States may also limit outgoing shipments of waste on environmental grounds as set out in Regulation (EC) No 1013/2006.
2
The network shall be designed to enable the Community as a whole to become self-sufficient in waste disposal as well as in the recovery of waste referred to in paragraph 1, and to enable Member States to move towards that aim individually, taking into account geographical circumstances or the need for specialised installations for certain types of waste.
3
The network shall enable waste to be disposed of or waste referred to in paragraph 1 to be recovered in one of the nearest appropriate installations, by means of the most appropriate methods and technologies, in order to ensure a high level of protection for the environment and public health.
4
The principles of proximity and self-sufficiency shall not mean that each Member State has to possess the full range of final recovery facilities within that Member State.