Article 17
If the refund application relates to a refund period of less than one calendar year but not less than three months, the amount of VAT for which a refund is applied for may not be less than EUR 400 or the equivalent in national currency.
If the refund application relates to a refund period of a calendar year or the remainder of a calendar year, the amount of VAT may not be less than EUR 50 or the equivalent in national currency.