Amendments to Directive 2002/60/EC
Article 22
Directive 2002/60/EC is hereby amended as follows:
1. in Article 18(1), point (b) shall be replaced by the following:
  1. a national laboratory is responsible for coordinating standards and diagnostic methods in each Member State in accordance with Annex IV.
Member States shall make the details of their national laboratory, and any subsequent changes, available to the other Member States and to the public in a manner that may be specified in accordance with the procedure referred to in Article 23(2).
;
2. Annex IV shall be amended as follows:
  1. the title shall be replaced by the following:

Duties of national laboratories for African swine fever
;
  2. point 1 shall be deleted.