Amendments to Directive 2000/75/EC
Article 19
Directive 2000/75/EC is hereby amended as follows:
1. Article 15 shall be replaced by the following:
Article 15
1
Member States shall designate a national laboratory responsible for carrying out the laboratory tests provided for by this Directive, and shall make the details of that laboratory, and any subsequent changes, available to the other Member States and to the public.
Detailed rules for the uniform application of this paragraph may be adopted in accordance with the procedure referred to in Article 20(2).
2
The tasks of the national laboratories designated in accordance with paragraph 1 are listed in Annex I.
3
The national laboratories designated in accordance with paragraph 1 of this Article shall liaise with the Community reference laboratory referred to in Article 16.
;
2. in Annex I, Section A shall be deleted.