Article 6
1
The responsible official body shall accredit suppliers once it has verified that their production methods and establishments meet the requirements of this Directive with regard to the nature of the activities they carry out. Accreditation must be renewed if a supplier decides to carry out activities other than those for which he has received accreditation.
2
The responsible official body shall accredit laboratories once it has verified that these laboratories, their methods and their establishments meet the requirements of this Directive to be specified in accordance with the procedure referred to in Article 21(2), with regard to the testing activities they carry out. Accreditation must be renewed if a laboratory decides to carry out activities other than those for which it has received accreditation.
3
The responsible official body shall take the necessary measures if the requirements referred to in paragraphs 1 and 2 cease to be met. To this end, it shall take particular account of the conclusions of any check carried out in accordance with Article 7.
4
The supervision and monitoring of suppliers, establishments and laboratories shall be carried out regularly by or under the responsibility of the responsible official body, which shall at all times have free access to all parts of establishments, in order to ensure compliance with the requirements of this Directive. Implementing measures concerning supervision and monitoring shall be adopted, as necessary, in accordance with the procedure referred to in Article 21(2).
If such supervision and monitoring reveal that the requirements of this Directive are not being met, the responsible official body shall take appropriate action.