Directive 2008/57/EC of the European Parliament and of the Council
of 17 June 2008
on the interoperability of the rail system within the Community
(Recast)
(Text with EEA relevance) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive (EU) 2016/797 of the European Parliament and of the Council of 11 May 2016 on the interoperability of the rail system within the European Union (Text with EEA relevance).

CHAPTER I GENERAL PROVISIONS

Article 1 Purpose and scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 2 Definitions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Overall compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 4 Essential requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER II TECHNICAL SPECIFICATIONS FOR INTEROPERABILITY

Article 5 Content of TSIs
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6 Adoption, review and publication of TSIs
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 7 Deficiencies in TSIs
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 8 Extension of the scope of TSIs
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 9 Derogations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER III INTEROPERABILITY CONSTITUENTS

Article 10 Placing on the market of interoperability constituents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 11 Conformity or suitability for use
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 12 Non-compliance of European specification with essential requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 13 Procedure for ‘EC’ declaration of conformity or suitability for use
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 14 Non-compliance of interoperability constituents with essential requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER IV SUBSYSTEMS

Article 15 Procedure for placing in service
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 16 Free movement of subsystems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 17 Conformity with TSIs and national rules
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 18 Procedure for establishing the ‘EC’ declaration of verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 19 Non-compliance of subsystems with essential requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 20 Placing in service of existing subsystems after renewal or upgrading
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER V VEHICLES

Article 21 Authorisation for placing in service of vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 22 First authorisation for placing in service of TSI conform vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 23 Additional authorisations for placing in service of TSI conform vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 24 First authorisation for placing in service of non-TSI conform vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 25 Additional authorisations for placing in service of non-TSI conform vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 26 Authorisation for types of vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 27 Classification of national rules
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER VI NOTIFIED BODIES

Article 28 Notified bodies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER VII COMMITTEE AND WORK PROGRAMME

Article 29 Committee procedure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 30 Complementary tasks
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 31 Work programme
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER VIII REGISTERS OF NETWORK AND VEHICLES

Article 32 Vehicle numbering system
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 33 National vehicle registers
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 34 European register of authorised types of vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 35 Register of infrastructure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER IX TRANSITIONAL PROVISIONS

Article 36 Draft reference systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER X FINAL PROVISIONS

Article 37 Motivation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 38 Transposition
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 39 Reports and information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 40 Repeal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 41 Entry into force
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 42 Addressees
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I SCOPE

1. Trans-European conventional rail system

1.1. Network
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Trans-European high-speed rail system

2.1. Network
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Compatibility of the railway system
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Extension of the scope

4.1. Subcategories of network and vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2. Cost safeguards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II SUBSYSTEMS

1. List of subsystems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Description of the subsystems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.1. Infrastructure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Energy
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Trackside control-command and signalling
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4. On-board control-command and signalling
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5. Operation and traffic management
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6. Telematics applications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7. Rolling stock
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.8. Maintenance
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III ESSENTIAL REQUIREMENTS

1. General requirements

1.1. Safety
1.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Reliability and availability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Health
1.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4. Environmental protection
1.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.4. The design and operation of the rail system must not lead to an inadmissible level of noise generated by it:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6. Accessibility
1.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Requirements specific to each subsystem

2.1. Infrastructure

2.1.1. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.1.2. Accessibility
2.1.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Energy

2.2.1. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2.2. Environmental protection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2.3. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Control-command and signalling

2.3.1. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.2. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4. Rolling stock

2.4.1. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.2. Reliability and availability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.3. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.4. Controls
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.5. Accessibility
2.4.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5. Maintenance

2.5.1. Health and safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5.2. Environmental protection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5.3. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6. Operation and traffic management

2.6.1. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6.2. Reliability and availability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6.3. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6.4. Accessibility
2.6.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7. Telematics applications for freight and passengers

2.7.1. Technical compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7.2. Reliability and availability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7.3. Health
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7.4. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7.5. Accessibility
2.7.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV ‘EC’ DECLARATION OF CONFORMITY AND SUITABILITY FOR USE OF INTEROPERABILITY CONSTITUENTS

1. Interoperability constituents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.1. Multiple-use constituents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Multiple-use constituents having specific characteristics
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Specific constituents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Contents of the ‘EC’ declaration
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX V ‘EC’ DECLARATION OF VERIFICATION OF SUBSYSTEMS

1. ‘EC’ DECLARATION OF VERIFICATION OF SUBSYSTEMS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. ‘EC’ DECLARATION OF VERIFICATION OF SUBSYSTEMS IN THE CASE OF MODIFICATIONS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. ‘EC’ DECLARATION OF VERIFICATION OF SUBSYSTEMS IN THE CASE OF ADDITIONAL VERIFICATIONS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VI ‘EC’ VERIFICATION PROCEDURE FOR SUBSYSTEMS

1. GENERAL PRINCIPLES
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. CERTIFICATE OF VERIFICATION ISSUED BY A NOTIFIED BODY

2.1. Introduction
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Intermediate statement of verification (ISV)

2.2.1. Principles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2.2. Parts of the subsystem
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2.3. Stages of the verification procedure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Certificate of verification
2.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4. Technical file accompanying the EC declaration of verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5. Surveillance by notified bodies
2.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.6. Submission
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7. Publication
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.8. Language
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. CERTIFICATE OF VERIFICATION ISSUED BY A DESIGNATED BODY

3.1. Introduction
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2. Certificate of verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3. Technical file
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.4. Language
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. VERIFICATION OF PARTS OF SUBSYSTEMS IN ACCORDANCE WITH ARTICLE 18(5)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VII PARAMETERS TO BE CHECKED IN CONJUNCTION WITH THE PLACING IN SERVICE OF NON-TSI CONFORM VEHICLES AND THE CLASSIFICATION OF THE NATIONAL RULES

1. List of parameters
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Classification of the rules
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Group A
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Group B
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Group C
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VIII MINIMUM CRITERIA WHICH MUST BE TAKEN INTO ACCOUNT BY THE MEMBER STATES WHEN NOTIFYING BODIES
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. The body and the staff responsible for the checks must carry out the checks with the greatest possible professional integrity and the greatest possible technical competence and must be free of any pressure and incentive, in particular of a financial type, which could affect their judgement or the results of their inspection, in particular from persons or groups of persons affected by the results of the checks.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. The staff responsible for the checks must possess:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IX FILE FOR SUBMITTING A DEROGATION
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX X

PART A Directives repealed
(referred to in Article 40)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART B Time limits for transposition into national law
(referred to in Article 40)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX XI CORRELATION TABLE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .