CHAPTER IV

SUBSYSTEMS

Procedure for placing in service
Article 15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Free movement of subsystems
Article 16 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Conformity with TSIs and national rules
Article 17 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Procedure for establishing the ‘EC’ declaration of verification
Article 18 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Non-compliance of subsystems with essential requirements
Article 19 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Placing in service of existing subsystems after renewal or upgrading
Article 20 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive (EU) 2016/797 of the European Parliament and of the Council of 11 May 2016 on the interoperability of the rail system within the European Union (Text with EEA relevance).