CHAPTER IV

GENERAL AND FINAL PROVISIONS
Article 18
Directive 69/169/EEC shall be repealed and replaced by this Directive with effect from 1 December 2008.
References to the repealed Directive shall be construed as references to this Directive and shall be read in accordance with the correlation table in the Annex.