Article 3
In Article 1(2) of Directive 98/8/EC the following point shall be added:
1. Directive 98/79/EC of the European Parliament and of the Council of 27 October 1998 on in vitro diagnostic medical devices .
OJ L 331, 7.12.1998, p. 1. Directive as last amended by Regulation (EC) No 1882/2003 (OJ L 284, 31.10.2003, p. 1).’