Directive 2006/95/EC of the European Parliament and of the Council
of 12 December 2006
on the harmonisation of the laws of Member States relating to electrical equipment designed for use within certain voltage limits
(codified version)
(Text with EEA relevance) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2014/35/EU of the European Parliament and of the Council of 26 February 2014 on the harmonisation of the laws of the Member States relating to the making available on the market of electrical equipment designed for use within certain voltage limits Text with EEA relevance.

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 14 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 16 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I Principal Elements of the Safety Objectives for Electrical Equipment Designed For Use within Certain Voltage Limits

1. General conditions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Protection against hazards arising from the electrical equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Protection against hazards which may be caused by external influences on the electrical equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II Equipment and Phenomena outside the Scope of this Directive
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III Ce Conformity Marking And EC Declaration of Conformity

A. CE conformity marking
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

B. EC declaration of conformity
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV Internal Production Control
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. The manufacturer must establish the technical documentation described in point 3 and he or his authorised representative established within the Community must keep it on Community territory at the disposal of the relevant national authorities for inspection purposes for a period ending at least 10 years after the last product has been manufactured.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Technical documentation must enable the conformity of the electrical equipment to the requirements of this Directive to be assessed. It must, as far as relevant for such assessment, cover the design, manufacture and operation of the electrical equipment. It must include:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX V

Part A Repealed Directive with its amendment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Part B List of time-limits for transposition into national law and application
(referred to in Article 14)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VI Correlation Table
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .