SECTION I

GENERAL PROVISIONS

Exposure limit values
Article 3
1
The exposure limit values for non-coherent radiation, other than that emitted by natural sources of optical radiation, are as set out in Annex I.
2
The exposure limit values for laser radiation are as set out in Annex II.