SECTION I

GENERAL PROVISIONS

Aim and scope
Article 1
1
This Directive, which is the 19th individual Directive within the meaning of Article 16(l) of Directive 89/391/EEC, lays down minimum requirements for the protection of workers from risks to their health and safety arising or likely to arise from exposure to artificial optical radiation during their work.
2
This Directive refers to the risk to the health and safety of workers due to adverse effects caused by exposure to artificial optical radiation to the eyes and to the skin.
3
Directive 89/391/EEC shall apply fully to the whole area referred to in paragraph 1, without prejudice to more stringent and/or more specific provisions contained in this Directive.