Transitional provision
Article 24
1
Member States shall ensure that any waste facility which has been granted a permit or which is already in operation on 1 May 2008 complies with the provisions of this Directive by 1 May 2012, except for those set out in Article 14(1) for which compliance must be ensured by 1 May 2014 and for those set out in Article 13(6) for which compliance must be ensured in accordance with the timetable laid down therein.
2
Paragraph 1 shall not apply to waste facilities closed by 1 May 2008.
3
Member States shall ensure that, from 1 May 2006 and notwithstanding any closure of a waste facility after that date and before 1 May 2008, extractive waste is managed in a way that does not prejudice the fulfilment of Article 4(1) of this Directive, and other applicable environmental requirements set out in Community legislation, including Directive 2000/60/EC.
4
Articles 5, 6(3) to (5), 7, 8, 12(1) and (2) and 14(1) to (3) shall not apply to those waste facilities that:
- stopped accepting waste before 1 May 2006,
- are completing the closure procedures in accordance with the applicable Community or national legislation or programmes approved by the competent authority, and
- will be effectively closed by 31 December 2010.
Member States shall notify such cases to the Commission by 1 August 2008 and ensure that these facilities are managed in a way that does not prejudice the achievement of the objectives of this Directive, in particular the objectives of Article 4(1), and those of any other Community legislation, including Directive 2000/60/EC.