Inspections by the competent authority
Article 17
1
Prior to the commencement of deposit operations and at regular intervals thereafter, including the after-closure phase, to be decided by the Member State concerned, the competent authority shall inspect any waste facility covered by Article 7 in order to ensure that it complies with the relevant conditions of the permit. An affirmative finding shall in no way reduce the responsibility of the operator under the conditions of the permit.
2
Member States shall require the operator to keep up-to-date records of all waste management operations and make them available for inspection by the competent authority and to ensure that, in the event of a change of operator during the management of a waste facility, there is an appropriate transfer of relevant up-to-date information and records relating to the waste facility.