TITLE III

FREEDOM OF ESTABLISHMENT
CHAPTER III

Recognition on the basis of coordination of minimum training conditions
Section 4

Dental practitioners

Basic dental training
Article 34
1
Admission to basic dental training presupposes possession of a diploma or certificate giving access, for the studies in question, to universities or higher institutes of a level recognised as equivalent, in a Member State.
2
Basic dental training shall comprise a total of at least five years of study, which may in addition be expressed with the equivalent ECTS credits, and shall consist of at least
5 000
hours of full-time theoretical and practical training that comprises at least the programme described in point 5.3.1 of Annex V and that is provided in a university, in a higher institute providing training recognised as being of an equivalent level or under the supervision of a university.
The Commission shall be empowered to adopt delegated acts in accordance with Article 57c concerning the amendment of the list set out in point 5.3.1 of Annex V with a view to adapting it to scientific and technical progress.
The amendments referred to in the second subparagraph shall not entail an amendment of existing essential legislative principles in Member States regarding the structure of professions as regards training and conditions of access by natural persons. Such amendments shall respect the responsibility of the Member States for the organisation of education systems, as set out in Article 165(1) TFEU.
3
Basic dental training shall provide an assurance that the person in question has acquired the following knowledge and skills:
a
adequate knowledge of the sciences on which dentistry is based and a good understanding of scientific methods, including the principles of measuring biological functions, the evaluation of scientifically established facts and the analysis of data;
b
adequate knowledge of the constitution, physiology and behaviour of healthy and sick persons as well as the influence of the natural and social environment on the state of health of the human being, in so far as these factors affect dentistry;
c
adequate knowledge of the structure and function of the teeth, mouth, jaws and associated tissues, both healthy and diseased, and their relationship to the general state of health and to the physical and social well-being of the patient;
d
adequate knowledge of clinical disciplines and methods, providing the dentist with a coherent picture of anomalies, lesions and diseases of the teeth, mouth, jaws and associated tissues and of preventive, diagnostic and therapeutic dentistry;
e
suitable clinical experience under appropriate supervision.
This training shall provide him with the skills necessary for carrying out all activities involving the prevention, diagnosis and treatment of anomalies and diseases of the teeth, mouth, jaws and associated tissues.
Substituted by Directive 2013/55/EU of the European Parliament and of the Council of 20 November 2013 amending Directive 2005/36/EC on the recognition of professional qualifications and Regulation (EU) No 1024/2012 on administrative cooperation through the Internal Market Information System (‘the IMI Regulation’) (Text with EEA relevance).