Safeguard clause
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2009/125/EC of the European Parliament and of the Council of 21 October 2009 establishing a framework for the setting of ecodesign requirements for energy-related products (recast) (Text with EEA relevance).