Directive 2004/49/EC of the european parliament and of the council
of 29 April 2004
on safety on the Community's railways and amending Council Directive 95/18/EC on the licensing of railway undertakings and Directive 2001/14/EC on the allocation of railway infrastructure capacity and the levying of charges for the use of railway infrastructure and safety certification
(Railway Safety Directive) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive (EU) 2016/798 of the European Parliament and of the Council of 11 May 2016 on railway safety (Text with EEA relevance).

CHAPTER I INTRODUCTORY PROVISIONS

Article 1 Purpose
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 2 Scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Definitions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER II DEVELOPMENT AND MANAGEMENT OF SAFETY

Article 4 Development and improvement of railway safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 5 Common safety indicators
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6 Common safety methods
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 7 Common safety targets
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 8 National safety rules
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 9 Safety management systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER III SAFETY CERTIFICATION AND AUTHORISATION

Article 10 Safety certificates
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 11 Safety authorisation of infrastructure managers
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 12 Application requirements relating to safety certification and safety authorisation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 13 Access to training facilities
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 14 Placing in service of in-use rolling stock
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 14a Maintenance of vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 15 Harmonisation of safety certificates
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER IV SAFETY AUTHORITY

Article 16 Tasks
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 17 Decision-making principles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 18 Annual report
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER V ACCIDENT AND INCIDENT INVESTIGATION

Article 19 Obligation to investigate
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 20 Status of investigation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 21 Investigating body
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 22 Investigation procedure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 23 Reports
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 24 Information to be sent to the Agency
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 25 Safety recommendations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER VI IMPLEMENTING POWERS

Article 26 Adaptation of the Annexes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 27 Committee procedure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 28 Implementing measures
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER VII GENERAL AND FINAL PROVISIONS

Article 29 Amendments to Directive 95/18/EC
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 30 Amendments to Directive 2001/14/EC
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 31 Report and further Community action
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 32 Penalties
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 33 Implementation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 34 Entry into force
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 35 Addressees
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I COMMON SAFETY INDICATORS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1. Indicators relating to accidents

1.1. Total and relative (to train-kilometres) number of significant accidents and a break-down for the following types of accidents:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Total and relative (to train-kilometres) number of persons seriously injured and killed by type of accident divided into the following categories:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Indicators relating to dangerous goods
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Indicators relating to suicides
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Indicators relating to precursors of accidents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. Indicators to calculate the economic impact of accidents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. Indicators relating to technical safety of infrastructure and its implementation

6.1. Percentage of tracks with Train Protection Systems (TPSs) in operation and percentage of train-kilometres using on-board TPSs, where these systems provide:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.2. Number of level crossings (total, per line kilometre and track kilometre) by the following five types:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix Common definitions for the CSIs and methods of calculating the economic impact of accidents

1. Indicators relating to accidents
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Indicators relating to dangerous goods
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Indicators relating to suicides
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Indicators relating to precursors of accidents
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. Common methodologies to calculate the economic impact of accidents
5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.3. Definitions
5.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

VT = monetary value of travel time savings

Value of time for a passenger of a train (an hour)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Value of time for a freight train (an hour)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CM = Cost of 1 minute of delay of a train

Passenger train
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Freight train
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Scope of the model
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. Indicators relating to technical safety of infrastructure and its implementation
6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. Definitions of the scaling bases
7.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II NOTIFICATION OF NATIONAL SAFETY RULES
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III SAFETY MANAGEMENT SYSTEMS

1. Requirements on the safety management system
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Basic elements of the safety management system
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV DECLARATIONS FOR NETWORK SPECIFIC PART OF SAFETY CERTIFICATE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX V PRINCIPAL CONTENT OF ACCIDENT AND INCIDENT INVESTIGATION REPORT

1.. Summary
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Immediate facts of the occurrence
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Record of investigations and inquiries
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Analysis and conclusions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. Measures that have been taken
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. Recommendations