CHAPTER VII

GENERAL AND FINAL PROVISIONS

Amendments to Directive 95/18/EC
Article 29 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendments to Directive 2001/14/EC
Article 30 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Report and further Community action
Article 31 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Penalties
Article 32 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Implementation
Article 33 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Entry into force
Article 34 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Addressees
Article 35 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive (EU) 2016/798 of the European Parliament and of the Council of 11 May 2016 on railway safety (Text with EEA relevance).