CHAPTER V

ACCIDENT AND INCIDENT INVESTIGATION

Obligation to investigate
Article 19 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Status of investigation
Article 20 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Investigating body
Article 21 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Investigation procedure
Article 22 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Reports
Article 23 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Information to be sent to the Agency
Article 24 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Safety recommendations
Article 25 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive (EU) 2016/798 of the European Parliament and of the Council of 11 May 2016 on railway safety (Text with EEA relevance).