CHAPTER III

SAFETY CERTIFICATION AND AUTHORISATION

Safety certificates
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Safety authorisation of infrastructure managers
Article 11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Application requirements relating to safety certification and safety authorisation
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Access to training facilities
Article 13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Placing in service of in-use rolling stock
Article 14 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Maintenance of vehicles
Article 14a . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Harmonisation of safety certificates
Article 15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive (EU) 2016/798 of the European Parliament and of the Council of 11 May 2016 on railway safety (Text with EEA relevance).