DIRECTIVE 2004/40/EC OF THE EUROPEAN PARLIAMENT AND OF THE COUNCIL
of 29 April 2004
on the minimum health and safety requirements regarding the exposure of workers to the risks arising from physical agents (electromagnetic fields) (18th individual Directive within the meaning of Article 16(1) of Directive 89/391/EEC) (repealed)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SECTION I

GENERAL PROVISIONS

Aim and scope
Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Definitions
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Exposure limit values and action values
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SECTION II

OBLIGATIONS OF EMPLOYERS

Determination of exposure and assessment of risks
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Provisions aimed at avoiding or reducing risks
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Worker information and training
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Consultation and participation of workers
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SECTION III

MISCELLANEOUS PROVISIONS

Health surveillance
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Sanctions
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Technical amendments
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Committee
Article 11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SECTION IV

FINAL PROVISIONS

Reports
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Transposition
Article 13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Entry into force
Article 14 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Addressees
Article 15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX

EXPOSURE LIMIT AND ACTION VALUES FOR ELECTROMAGNETIC FIELDS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
A.

EXPOSURE LIMIT VALUES
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
B.

ACTION VALUES
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2013/35/EU of the European Parliament and of the Council of 26 June 2013 on the minimum health and safety requirements regarding the exposure of workers to the risks arising from physical agents (electromagnetic fields) (20th individual Directive within the meaning of Article 16(1) of Directive 89/391/EEC) and repealing Directive 2004/40/EC.