CHAPTER III

DONOR SELECTION AND EVALUATION

Consent
Article 13
1
The procurement of human tissues or cells shall be authorised only after all mandatory consent or authorisation requirements in force in the Member State concerned have been met.
2
Member States shall, in keeping with their national legislation, take all necessary measures to ensure that donors, their relatives or any persons granting authorisation on behalf of the donors are provided with all appropriate information as referred to in the Annex.