Criteria to be satisfied by designated bodies
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2014/32/EU of the European Parliament and of the Council of 26 February 2014 on the harmonisation of the laws of the Member States relating to the making available on the market of measuring instruments (recast) (Text with EEA relevance).