CHAPTER I

GENERAL PROVISIONS

Subject matter and scope
Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Definitions
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Placing on the market and/or putting into service
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Free movement of equipment
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Essential requirements
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Harmonised standards
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2014/30/EU of the European Parliament and of the Council of 26 February 2014 on the harmonisation of the laws of the Member States relating to electromagnetic compatibility (recast) Text with EEA relevance.