Article 12
1
Member States may express their national levels of taxation in units other than those specified in Articles 7 to 10 provided that the corresponding levels of taxation, following conversion into those units, are not below the minimum levels specified in this Directive.
2
For energy products specified in Articles 7, 8 and 9, with levels of taxation based on volumes, the volume shall be measured at a temperature of 15° C.