Article 2
All the varietal characteristics within the meaning of Article 1(2)(a), and any characteristics which are marked by an asterisk (*) in the test guidelines referred to in Article 1(2)(b) shall be used, providing that observation of a characteristic is not rendered impossible by the expression of any other characteristics, and providing that the expression of a characteristic is not prevented by the environmental conditions under which the test is conducted.