CHAPTER III

STATIONARY INSTALLATIONS

Changes relating to installations
Article 7
The operator shall inform the competent authority of any planned changes to the nature or functioning of the installation, or any extension or significant reduction of its capacity, which may require updating the greenhouse gas emissions permit. Where appropriate, the competent authority shall update the permit. Where there is a change in the identity of the installation's operator, the competent authority shall update the permit to include the name and address of the new operator.
Inserted by Directive 2008/101/EC of the European Parliament and of the Council of 19 November 2008 amending Directive 2003/87/EC so as to include aviation activities in the scheme for greenhouse gas emission allowance trading within the Community (Text with EEA relevance).
Substituted by Directive 2009/29/EC of the European Parliament and of the Council of 23 April 2009 amending Directive 2003/87/EC so as to improve and extend the greenhouse gas emission allowance trading scheme of the Community (Text with EEA relevance).