Changes relating to installations
Article 7
The operator shall inform the competent authority of any changes planned in the nature or functioning, or an extension, of the installation which may require updating of the greenhouse gas emissions permit. Where appropriate, the competent authority shall update the permit. Where there is a change in the identity of the installation's operator, the competent authority shall update the permit to include the name and address of the new operator.