CHAPTER IV

PROVISIONS APPLYING TO AVIATION AND STATIONARY INSTALLATIONS

Competent authority
Article 18
Member States shall make the appropriate administrative arrangements, including the designation of the appropriate competent authority or authorities, for the implementation of the rules of this Directive. Where more than one competent authority is designated, the work of these authorities undertaken pursuant to this Directive must be coordinated.
Member States shall in particular ensure coordination between their designated focal point for approving project activities pursuant to Article 6 (1)(a) of the Kyoto Protocol and their designated national authority for the implementation of Article 12 of the Kyoto Protocol respectively designated in accordance with subsequent decisions adopted under the UNFCCC or the Kyoto Protocol.
Inserted by Directive 2008/101/EC of the European Parliament and of the Council of 19 November 2008 amending Directive 2003/87/EC so as to include aviation activities in the scheme for greenhouse gas emission allowance trading within the Community (Text with EEA relevance).
Inserted by Directive 2004/101/EC of the European Parliament and of the Council of 27 October 2004 amending Directive 2003/87/EC establishing a scheme for greenhouse gas emission allowance trading within the Community, in respect of the Kyoto Protocol's project mechanisms (Text with EEA relevance).