Allocation and issue of allowances
Article 11
1
For the three-year period beginning 1 January 2005, each Member State shall decide upon the total quantity of allowances it will allocate for that period and the allocation of those allowances to the operator of each installation. This decision shall be taken at least three months before the beginning of the period and be based on its national allocation plan developed pursuant to Article 9 and in accordance with Article 10, taking due account of comments from the public.
2
For the five-year period beginning 1 January 2008, and for each subsequent five-year period, each Member State shall decide upon the total quantity of allowances it will allocate for that period and initiate the process for the allocation of those allowances to the operator of each installation. This decision shall be taken at least 12 months before the beginning of the relevant period and be based on the Member State's national allocation plan developed pursuant to Article 9 and in accordance with Article 10, taking due account of comments from the public.
3
Decisions taken pursuant to paragraph 1 or 2 shall be in accordance with the requirements of the Treaty, in particular Articles 87 and 88 thereof. When deciding upon allocation, Member States shall take into account the need to provide access to allowances for new entrants.
4
The competent authority shall issue a proportion of the total quantity of allowances each year of the period referred to in paragraph 1 or 2, by 28 February of that year.