Report
Article 13
Before 10 September 2011 the Commission shall submit to the European Parliament, the Council, the European Economic and Social Committee and the Committee of the Regions a report making an initial evaluation of the implementation of this Directive, in particular with regard to the equivalence of the various initial qualification systems provided for in Article 3, and the efficiency thereof in achieving the target level of qualification. The report shall be accompanied by appropriate proposals, if necessary.