CHAPTER VI

ORGANISATION OF ACCESS TO THE SYSTEM

Third party access
Article 18 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Access to storage
Article 19 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Access to upstream pipeline networks
Article 20 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Refusal of access
Article 21 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

New infrastructure
Article 22 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Market opening and reciprocity
Article 23 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Direct lines
Article 24 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Regulatory authorities
Article 25 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2009/73/EC of the European Parliament and of the Council of 13 July 2009 concerning common rules for the internal market in natural gas and repealing Directive 2003/55/EC (Text with EEA relevance).