CHAPTER III

TRANSMISSION, STORAGE AND LNG

Designation of system operators
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Tasks of system operators
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Unbundling of transmission system operators
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Confidentiality for transmission system operators
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2009/73/EC of the European Parliament and of the Council of 13 July 2009 concerning common rules for the internal market in natural gas and repealing Directive 2003/55/EC (Text with EEA relevance).