CHAPTER VIII

FINAL PROVISIONS

Safeguard measures
Article 24 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Monitoring of imports of electricity
Article 25 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Derogations
Article 26 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Review Procedure
Article 27 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Reporting
Article 28 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Repeals
Article 29 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Implementation
Article 30 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Entry into force
Article 31 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Addressees
Article 32 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2009/72/EC of the European Parliament and of the Council of 13 July 2009 concerning common rules for the internal market in electricity and repealing Directive 2003/54/EC (Text with EEA relevance).