CHAPTER II

GENERAL RULES FOR THE ORGANISATION OF THE SECTOR

Public service obligations and customer protection
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Monitoring of security of supply
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Technical rules
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2009/72/EC of the European Parliament and of the Council of 13 July 2009 concerning common rules for the internal market in electricity and repealing Directive 2003/54/EC (Text with EEA relevance).