CHAPTER IV

MISCELLANEOUS AND FINAL PROVISIONS

Review
Article 18
The Commission shall report to the Council every three years on the operation of this Directive. On the basis of these reports, the Commission shall, where appropriate, propose to the Council any amendments to the Directive that prove necessary in order better to ensure effective taxation of savings income and to remove undesirable distortions of competition.