CHAPTER II

OBLIGATIONS ON MEMBER STATES AUTHORITIES

Provisions for existing establishments
Article 7
Member States may decide to maintain national provisions for nine months after the date laid down in Article 32 so as to enable blood establishments operating under their legislation to comply with the requirements of this Directive.