CHAPTER VI

PROVISIONS FOR THE QUALITY AND SAFETY OF BLOOD AND BLOOD COMPONENTS

Voluntary and unpaid blood donation
Article 20
1
Member States shall take the necessary measures to encourage voluntary and unpaid blood donations with a view to ensuring that blood and blood components are in so far as possible provided from such donations.
2
Member States shall submit reports to the Commission on these measures two years after the entry into force of this Directive, and thereafter every three years. On the basis of these reports the Commission shall inform the European Parliament and the Council of any necessary further measure it intends to take at Community level.