CHAPTER IV

QUALITY MANAGEMENT

Quality system for blood establishments
Article 11
1
Member States shall take all necessary measures to ensure that each blood establishment establishes and maintains a quality system for blood establishments based on the principles of good practice.
2
The Commission shall establish the Community standards and specifications referred to in Article 29(h) for the activities relating to a quality system to be carried out by a blood establishment.