Directive 2002/96/EC of the European Parliament and of the Council
of 27 January 2003
on waste electrical and electronic equipment (WEEE) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2012/19/EU of the European Parliament and of the Council of 4 July 2012 on waste electrical and electronic equipment (WEEE) (recast) (Text with EEA relevance).

Article 1 Objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 2 Scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Definitions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 4 Product design
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 5 Separate collection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6 Treatment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 7 Recovery
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 8 Financing in respect of WEEE from private households
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 9 Financing in respect of WEEE from users other than private households
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 10 Information for users
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 11 Information for treatment facilities
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 12 Information and reporting
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 13 Adaptation to scientific and technical progress
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 14 Committee
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 15 Penalties
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 16 Inspection and monitoring
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 17 Transposition
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 18 Entry into force
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 19 Addressees
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IA Categories of electrical and electronic equipment covered by this Directive
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IB List of products which shall be taken into account for the purpose of this Directive and which fall under the categories of Annex IA

1. Large household appliances
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Small household appliances
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. IT and telecommunications equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Consumer equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. Lighting equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. Electrical and electronic tools (with the exception of large-scale stationary industrial tools)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. Toys, leisure and sports equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8. Medical devices (with the exception of all implanted and infected products)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9. Monitoring and control instruments
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10. Automatic dispensers
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II Selective treatment for materials and components of waste electrical and electronic equipment in accordance with Article 6(1)
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III Technical requirements in accordance with Article 6(3)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV Symbol for the marking of electrical and electronic equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .