Information for treatment facilities
Article 11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2012/19/EU of the European Parliament and of the Council of 4 July 2012 on waste electrical and electronic equipment (WEEE) (recast) (Text with EEA relevance).