ANNEX V

SPECIFICATIONS
Part A:

General specifications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Part B:

Other specifications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Regulation (EU) No 10/2011 of 14 January 2011 on plastic materials and articles intended to come into contact with food (Text with EEA relevance).